Front Rear Coated Disc Brake Rotors And Semi-Metallic Pads Kit For Toyota Corolla Prius Prime KGS-101852

Vendor: Transit Auto
Type: Brake Pad and Rotor
Price: 199.78

Part Name: Brake Pad and Rotor Kit

Part Description: Disc Rotors and Semi-Metallic Brake Pads Kit

Position: Front and Rear

Part Number: KGS-101852

This Kit includes 6 parts:

2x Front Coated Genius Disc Brake Rotor (Both Sides)

1x Front Semi-Metallic SIM Brake Pad Set (Hardware Included)

2x Rear Coated Genius Disc Brake Rotor (Both Sides)

1x Rear Semi-Metallic SIM Brake Pad Set (Hardware Included)

Vehicles (see fitment table for detailed fitment information):

2021 Toyota Corolla

2020 Toyota Corolla

2019 Toyota Prius Prime

2018 Toyota Prius Prime

2017 Toyota Prius

2017 Toyota Prius Prime

2016 Toyota Prius