Front Ceramic Disc Brake Pads NWF-PRC1184A For Toyota Prius Yaris C Corolla Lexus CT200h Prime Plug-In Scion iQ AWD-e

Vendor: AmeriBRAKES
Type: Brake Pad
Price: 59.53

Part Name: Brake Pad

Part Description: Ceramic Brake Pads

Position: Front

Part Number: NWF-PRC1184A

Vehicles (see fitment table for detailed fitment information):

2023 Toyota Corolla

2022 Toyota Corolla

2022 Toyota Prius

2022 Toyota Prius AWD-e

2021 Toyota Corolla

2021 Toyota Prius

2021 Toyota Prius AWD-e

2020 Toyota Corolla

2020 Toyota Prius

2020 Toyota Prius AWD-e

2019 Toyota Prius

2019 Toyota Prius AWD-e

2019 Toyota Prius C

2019 Toyota Prius Prime

2018 Toyota Prius

2018 Toyota Prius C

2018 Toyota Prius Prime

2018 Toyota Yaris

2017 Lexus CT200h

2017 Toyota Prius

2017 Toyota Prius C

2017 Toyota Prius Prime

2017 Toyota Yaris

2016 Lexus CT200h

2016 Toyota Prius

2016 Toyota Prius C

2016 Toyota Yaris

2015 Lexus CT200h

2015 Toyota Prius

2015 Toyota Prius C

2015 Toyota Prius Plug-In

2015 Toyota Yaris

2014 Lexus CT200h

2014 Toyota Prius

2014 Toyota Prius C

2014 Toyota Prius Plug-In

2014 Toyota Yaris

2013 Lexus CT200h

2013 Scion iQ

2013 Toyota Prius

2013 Toyota Prius C

2013 Toyota Prius Plug-In

2013 Toyota Yaris

2012 Lexus CT200h

2012 Toyota Prius

2012 Toyota Prius C

2012 Toyota Prius Plug-In

2012 Toyota Yaris

2011 Lexus CT200h

2011 Toyota Prius

2011 Toyota Yaris

2010 Toyota Prius

2010 Toyota Yaris

2009 Toyota Yaris

2008 Toyota Yaris

2007 Toyota Yaris

2006 Toyota Yaris

Interchange/OEM Parts: PRC1184A 8301 8538 AD8538 PF8301X PF8538X QE8301X QE8538X SG8301X SG8538X SS8301X SS8538X UP8301X D1184 D1184A 1184 1184A