AmeriBRAKES Front Rear Ceramic Disc Brake Pads Kit For Toyota Prius Corolla Yaris Lexus CT200h Prime Plug-In KNF-101296

Vendor: AmeriBRAKES
Type: Brake Pad
Price: 88.14

Part Name: Brake Pad Kit

Position: Front and Rear

Part Number: KNF-101296

This Kit includes 2 parts:

1x Front Ceramic AmeriBRAKES Brake Pad Set (Hardware Included)

1x Rear Ceramic AmeriBRAKES Brake Pad Set (Hardware Included)

Vehicles (see fitment table for detailed fitment information):

2022 Toyota Corolla

2022 Toyota Prius

2021 Toyota Corolla

2021 Toyota Prius

2020 Toyota Corolla

2020 Toyota Prius

2019 Toyota Prius

2019 Toyota Prius Prime

2018 Toyota Prius

2018 Toyota Prius Prime

2018 Toyota Yaris

2017 Lexus CT200h

2017 Toyota Prius

2017 Toyota Prius Prime

2017 Toyota Yaris

2016 Lexus CT200h

2016 Toyota Prius

2016 Toyota Yaris

2015 Lexus CT200h

2015 Toyota Prius

2015 Toyota Yaris

2014 Lexus CT200h

2014 Toyota Prius

2014 Toyota Yaris

2013 Lexus CT200h

2013 Toyota Prius

2013 Toyota Prius Plug-In

2013 Toyota Yaris

2012 Lexus CT200h

2012 Toyota Prius

2012 Toyota Prius Plug-In

2012 Toyota Yaris

2011 Lexus CT200h

2011 Toyota Prius

2010 Toyota Prius

Interchange/OEM Parts: PRC1184A 8301 8538 AD8538 PF8301X PF8538X QE8301X QE8538X SG8301X SG8538X SS8301X SS8538X UP8301X D1184 D1184A 1184 1184A PRC1423 1354A D1354A 8463 8846 PF8463AX PF8463X QE8463AX QE8463X SG8463AX SG8463X SS8463AX SS8463X D1354 D1423 1354 1423